3/5/90 Notes for KAWAIK1 Profile:

System Exclusive must naturally be enabled for anything to work.

Make sure Program Changes are enabled on the K-1.  There is no
edit buffer in the K-1, so patches are sent to location d-8 for 
editing, and a program change must be sent after each patch 
is sent in order to activate the sound.  The same is true for both
Multi and Single patches.  The Program Change is also sent when 
switching between modes to switch the K-1 into the proper mode.
(The edit buffer is D-8 for Multi Patches)

Try not to use location d-8 in a Multi patch, unless you intentially 
want to use it while you tweak Single patch parameters - jumping 
back and forth to hear how the edited patch sounds in the Multi patch.

Note that there is never any clear choice for receive channel in
the Multi patch screen.  The best way to control the mouse channel
is manually in this case (function keys).

This version of the K-1 Profile corrects a couple of minor bugs,
and one ommision (Multi patch volume).  It also re-arranges the
Multi patch screen once again - this time I think I'm on the right
track, even though part of the screen is organized left to right and
part is top to bottom.  Please E-Mail your comments to me on Dr.T's
BBS.

-Bob Melvin
