USver           81 82 83
ask_for_usdir   80


80
This entry should contain a complete
DOS path to your MicroStation
directory.  It should have the
following format:

drive:\directory

Type or edit the DOS path using the
keys indicated at the bottom of your
screen, then press <Enter> to
accept.

The installation program assumes
that the source files are to be
copied there from the default
directory.  (i.e., the drive and
directory where you initiated this
installation.)  Normally this would
be your floppy diskette drive A:

Press <Esc> to abort the driver
installation.


81
This selection installs the driver
for version 4.0 of MicroStation.


82
This selection installs the driver
for version 5.0 of MicroStation.


83
This selection will display the
Installation Notes.

These notes contain last minute
information concerning the
MicroStation driver that may not
have made it into the User's
Manual in time for publication.



-1


